\[P^{\mu}_{\nu}\left(x\right)=\left(\frac{x+1}{x-1}\right)^{\mu/2}\mathbf{F}%
\left(\nu+1,-\nu;1-\mu;\tfrac{1}{2}-\tfrac{1}{2}x\right).\]