\[\lim_{N\to\infty}\int_{-1}^{1}{\left|f(x)-\sum_{n=m}^{N}c_{n}\mathsf{Ps}^{m}_{%
n}\left(x,\gamma^{2}\right)\right|}^{2}\,\mathrm{d}x=0.\]