\[\mathbf{J}^{2}\Psi(\mathbf{x})\equiv(\mathbf{s}+\mathbf{t}+\mathbf{u})^{2}\Psi%
(\mathbf{x})=j(j+1)\Psi(\mathbf{x}),\]