\[\int_{0}^{\infty}e^{-at}\sin\left(t^{2}\right)\,\mathrm{d}t=\sqrt{\frac{\pi}{2%
}}\mathrm{g}\left(\frac{a}{\sqrt{2\pi}}\right),\]