\[z\frac{{\mathrm{d}}^{2}\gamma^{*}}{{\mathrm{d}z}^{2}}+(a+1+z)\frac{\mathrm{d}%
\gamma^{*}}{\mathrm{d}z}+a\gamma^{*}=0.\]